
diff -r 39d3fc08414c -r 494b3b9db463 db/db-data.sql
--- a/db/db-data.sql	Tue May 01 23:32:41 2012 +0200
+++ b/db/db-data.sql	Tue May 01 23:54:09 2012 +0200
@@ -117,3 +117,23 @@
 VALUES
 ('task_type', nextval('code_list_item_id_seq'), true, 'Task type 2', 2, false, 0,
 0, 0, 0, 0, 0, '', '', '', current_timestamp, current_timestamp, false);
+
+-- Company status
+INSERT INTO code_list_item
+(code_list, id, i18n, name, rank, dflt, i1,
+i2, i3, l1, l2, l3, s1, s2, s3, created_at, updated_at, deleted)
+VALUES
+('company_status', nextval('code_list_item_id_seq'), true, 'company.status.active', 10, true, 0,
+0, 0, 0, 0, 0, '', '', '', current_timestamp, current_timestamp, false);
+INSERT INTO code_list_item
+(code_list, id, i18n, name, rank, dflt, i1,
+i2, i3, l1, l2, l3, s1, s2, s3, created_at, updated_at, deleted)
+VALUES
+('company_status', nextval('code_list_item_id_seq'), true, 'company.status.potencial', 20, false, 0,
+0, 0, 0, 0, 0, '', '', '', current_timestamp, current_timestamp, false);
+INSERT INTO code_list_item
+(code_list, id, i18n, name, rank, dflt, i1,
+i2, i3, l1, l2, l3, s1, s2, s3, created_at, updated_at, deleted)
+VALUES
+('company_status', nextval('code_list_item_id_seq'), true, 'company.status.inactive', 30, false, 0,
+0, 0, 0, 0, 0, '', '', '', current_timestamp, current_timestamp, false);




